From 3edf5d60f54bfd0cd2c818e5fb1ca133e324325d Mon Sep 17 00:00:00 2001
From: Ilion Beyst <ilion.beyst@gmail.com>
Date: Thu, 30 Dec 2021 11:45:59 +0100
Subject: rename to planetwars-server

---
 .../migrations/00000000000000_diesel_initial_setup/down.sql         | 6 ++++++
 1 file changed, 6 insertions(+)
 create mode 100644 planetwars-server/migrations/00000000000000_diesel_initial_setup/down.sql

(limited to 'planetwars-server/migrations/00000000000000_diesel_initial_setup/down.sql')

diff --git a/planetwars-server/migrations/00000000000000_diesel_initial_setup/down.sql b/planetwars-server/migrations/00000000000000_diesel_initial_setup/down.sql
new file mode 100644
index 0000000..a9f5260
--- /dev/null
+++ b/planetwars-server/migrations/00000000000000_diesel_initial_setup/down.sql
@@ -0,0 +1,6 @@
+-- This file was automatically created by Diesel to setup helper functions
+-- and other internal bookkeeping. This file is safe to edit, any future
+-- changes will be added to existing projects as new migrations.
+
+DROP FUNCTION IF EXISTS diesel_manage_updated_at(_tbl regclass);
+DROP FUNCTION IF EXISTS diesel_set_updated_at();
-- 
cgit v1.2.3

