From 3afa795cf559915e95b108e40beea18760b33064 Mon Sep 17 00:00:00 2001
From: Ilion Beyst <ilion.beyst@gmail.com>
Date: Tue, 15 Nov 2022 22:31:50 +0100
Subject: restyle turn progress bar

---
 web/pw-server/src/lib/components/Visualizer.svelte | 10 ++++++----
 1 file changed, 6 insertions(+), 4 deletions(-)

(limited to 'web/pw-server/src/lib/components/Visualizer.svelte')

diff --git a/web/pw-server/src/lib/components/Visualizer.svelte b/web/pw-server/src/lib/components/Visualizer.svelte
index 9859a59..a44fcc6 100644
--- a/web/pw-server/src/lib/components/Visualizer.svelte
+++ b/web/pw-server/src/lib/components/Visualizer.svelte
@@ -57,10 +57,12 @@
   </div>
 
   <div id="meta">
-    <div id="turnCounter">0 / 0</div>
-    <div>
-      <span>Ms per frame:&nbsp;</span>
-      <input type="number" id="speed" value="300" />
+    <div class="infocontainer">
+      <div id="turnCounter">0 / 0</div>
+      <div>
+        <span>Ms per frame:&nbsp;</span>
+        <input type="number" id="speed" value="300" />
+      </div>
     </div>
     <div class="slidecontainer">
       <input type="range" min="0" max="1" value="1" class="slider" id="turnSlider" />
-- 
cgit v1.2.3

