From 69f33763ab7ff5876cff23fb90cfd2497b3fe371 Mon Sep 17 00:00:00 2001
From: Ilion Beyst <ilion.beyst@gmail.com>
Date: Mon, 7 Feb 2022 22:50:02 +0100
Subject: styling: make sure visualizer does not overflow

---
 web/pw-server/src/routes/index.svelte | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'web/pw-server/src/routes/index.svelte')

diff --git a/web/pw-server/src/routes/index.svelte b/web/pw-server/src/routes/index.svelte
index 7cecba7..f8dc03f 100644
--- a/web/pw-server/src/routes/index.svelte
+++ b/web/pw-server/src/routes/index.svelte
@@ -121,11 +121,13 @@
     height: 40px;
     background-color: $bg-color;
     border-bottom: 1px solid;
+    flex-shrink: 0;
   }
 
   .container {
     display: flex;
     flex-grow: 1;
+    min-height: 0;
   }
 
   .sidebar-left {
@@ -140,6 +142,7 @@
   }
   .editor-container {
     flex-grow: 1;
+    flex-shrink: 1;
     overflow: hidden;
   }
 
-- 
cgit v1.2.3

